From f96b52ca0c959d36d018094523992434bb286be2 Mon Sep 17 00:00:00 2001
From: nsfisis <nsfisis@gmail.com>
Date: Fri, 25 Apr 2025 22:44:05 +0900
Subject: feat(blog/nuldoc): show static icon image until dynamic icon canvas
 is ready in /about/ page

---
 vhosts/blog/nuldoc-src/pages/AboutPage.tsx | 7 +++----
 1 file changed, 3 insertions(+), 4 deletions(-)

(limited to 'vhosts/blog/nuldoc-src/pages/AboutPage.tsx')

diff --git a/vhosts/blog/nuldoc-src/pages/AboutPage.tsx b/vhosts/blog/nuldoc-src/pages/AboutPage.tsx
index 1fe6adac..3d6583a4 100644
--- a/vhosts/blog/nuldoc-src/pages/AboutPage.tsx
+++ b/vhosts/blog/nuldoc-src/pages/AboutPage.tsx
@@ -25,15 +25,14 @@ export default function AboutPage(
             <header className="post-header">
               <h1 className="post-title">nsfisis</h1>
               <div className="my-icon">
-                <div id="myIcon" />
+                <div id="myIcon">
+                  <img src="/favicon.svg" />
+                </div>
                 <StaticScript
                   fileName="/my-icon.js"
                   defer="true"
                   config={config}
                 />
-                <noscript>
-                  <img src="/favicon.svg" />
-                </noscript>
               </div>
             </header>
             <div className="post-content">
-- 
cgit v1.2.3-70-g09d2

