From 0bc943a36c9992d1098d92812b19b70d371e6a0d Mon Sep 17 00:00:00 2001
From: nsfisis <nsfisis@gmail.com>
Date: Thu, 20 Mar 2025 21:16:55 +0900
Subject: feat(frontend): remove "player 1" or "player 2" labels

---
 frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx')

diff --git a/frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx b/frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx
index fb315ff..33f37be 100644
--- a/frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx
+++ b/frontend/app/components/GolfWatchApps/GolfWatchAppWaiting1v1.tsx
@@ -18,9 +18,9 @@ export default function GolfWatchAppWaiting1v1({
 				<div className="text-4xl">{gameDisplayName}</div>
 			</div>
 			<div className="grow grid grid-cols-3 gap-10 mx-auto text-black">
-				<PlayerNameAndIcon label="Player 1" profile={playerProfileA} />
+				<PlayerNameAndIcon profile={playerProfileA} />
 				<div className="text-8xl my-auto">vs.</div>
-				<PlayerNameAndIcon label="Player 2" profile={playerProfileB} />
+				<PlayerNameAndIcon profile={playerProfileB} />
 			</div>
 		</div>
 	);
-- 
cgit v1.2.3-70-g09d2

