From 27f509ccf4fbfeaa1bc2580ae2251461dc44ebfa Mon Sep 17 00:00:00 2001
From: nsfisis <nsfisis@gmail.com>
Date: Fri, 6 Mar 2026 02:16:59 +0900
Subject: feat(frontend): remove standalone submissions page

Submission history is now shown inline on the play screen,
making the dedicated /golf/:gameId/submissions page redundant.
---
 frontend/app/pages/SubmissionsPage.test.tsx | 17 -----------------
 1 file changed, 17 deletions(-)
 delete mode 100644 frontend/app/pages/SubmissionsPage.test.tsx

(limited to 'frontend/app/pages/SubmissionsPage.test.tsx')

diff --git a/frontend/app/pages/SubmissionsPage.test.tsx b/frontend/app/pages/SubmissionsPage.test.tsx
deleted file mode 100644
index f01f4c9..0000000
--- a/frontend/app/pages/SubmissionsPage.test.tsx
+++ /dev/null
@@ -1,17 +0,0 @@
-/**
- * @vitest-environment jsdom
- */
-import { cleanup, render, screen } from "@testing-library/react";
-import { afterEach, describe, expect, test } from "vitest";
-import SubmissionsPage from "./SubmissionsPage";
-
-afterEach(() => {
-	cleanup();
-});
-
-describe("SubmissionsPage", () => {
-	test("shows loading state initially", () => {
-		render(<SubmissionsPage gameId="1" />);
-		expect(screen.getByText("Loading...")).toBeDefined();
-	});
-});
-- 
cgit v1.3.1

