From 9bd1f89febe6311781aca3e8ee2b6a706a606e3c Mon Sep 17 00:00:00 2001
From: nsfisis <nsfisis@gmail.com>
Date: Sun, 18 Aug 2024 01:44:10 +0900
Subject: fix(frontend): fix an issue where loading icon does not rotate

---
 frontend/app/root.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'frontend/app/root.tsx')

diff --git a/frontend/app/root.tsx b/frontend/app/root.tsx
index 7924ce7..c05020c 100644
--- a/frontend/app/root.tsx
+++ b/frontend/app/root.tsx
@@ -1,4 +1,5 @@
 import { config } from "@fortawesome/fontawesome-svg-core";
+import "@fortawesome/fontawesome-svg-core/styles.css";
 import type { LinksFunction } from "@remix-run/node";
 import {
 	Links,
-- 
cgit v1.3.1

