From a46f583437e9b66ebec6fa22e27567a71b17b497 Mon Sep 17 00:00:00 2001
From: nsfisis <nsfisis@gmail.com>
Date: Sun, 21 Jul 2024 16:13:58 +0900
Subject: react router

---
 frontend/src/watch/apps/Connecting.jsx | 7 -------
 1 file changed, 7 deletions(-)
 delete mode 100644 frontend/src/watch/apps/Connecting.jsx

(limited to 'frontend/src/watch/apps/Connecting.jsx')

diff --git a/frontend/src/watch/apps/Connecting.jsx b/frontend/src/watch/apps/Connecting.jsx
deleted file mode 100644
index 464af23..0000000
--- a/frontend/src/watch/apps/Connecting.jsx
+++ /dev/null
@@ -1,7 +0,0 @@
-export default () => {
-  return (
-    <div>
-      接続中です......
-    </div>
-  );
-}
-- 
cgit v1.3.1

